Hume Global Learning Centre Sunbury

Sunbury Library

GALLERY

5

Budget

5

$21-50mil

0

PROJECT NAME
Hume Global Learning Centre, Sunbury

LOCATION
Macedon Street
Sunbury, Vic

PROJECT TYPE
New

LIBRARY TYPE
Public

PROJECT BUDGET
$21.5 million

COMPLETED
2019

This contemporary building features iconic architectural design with facilities including IT training rooms, small to medium sized meeting rooms, as well as two large multipurpose rooms equipped with audiovisual presentation equipment. It also includes the Sunbury Library, a gallery and Council’s Customer Service Centre.

Image Gallery

0

0

0

0

0

0

0

0

0

0

Comments

Hume City Council aspires to the development of strong integrated and sustainable communities and the provision of appropriate infrastructure in developing residential communities is integral to this. Dedicated to lifelong learning, Hume City is renowned (locally and internationally) for its existing Hume Global Learning Centre developments.

The new Hume Global Learning Centre is home to the new Sunbury Library, and supports delivery of tertiary and vocational education via the Hume Multiversity initiative. The centre is a lively learning hub for the whole community, welcoming people of all ages and backgrounds, and providing a variety of learning, cultural and social opportunities.

VISIT LIBRARY

Supporting resources

Awards Submission

PDF

Library details

Organisation/Council/Shire Name

Hume Shire, Victoria

Type of Build

New

Architect/Designer

–

Floor Space

–

Project Budget

$21.5 million

Principal Contractor/builder

CICG

Energy Rating

–

Carpet & Flooring Finishings

–

Shelving

Raeco

Signage

–

Fixed/Loose Joinery

–

Lighting

–

RFID Technology

–

AV Equipment

–

Awards & Recognition

–

Missing any details? Let us know.

Give Feedback